0 50 100 150 200 250 0

100

200

300

400 HISTOGRAMS h1 and h 2

0 50 100 150 200 250 0 1 2 3 4 5 x 10^4 CUMULATIVES

H1 and H 2

0 100 200 0 50 100 150 200 250 CUMULAGRAM

f g(f)=H 2-1(H1(f)) f g(f)

COMPARAGRAM

0 100 200 0 50 100 150 200 250